\begin{frage}[3]%% Anzahl Punkte für diese Aufgabe
  Bestimmen Sie die Umkehrfunktion von $y=f(x)$ mit
  $$y = 2\cdot{} 3^{\frac{x+1}{4}}$$
  \vspace{3mm}

  
  $$f^{-1}(x)=\LoesungsRaum{4\cdot{}\log_3\left(\frac{x}2\right)-1} $$
  \platzFuerBerechnungen{6}%%
  \TRAINER{}%%
  \end{frage} 
